function ChevronLeftIcon() {
  return (
    <svg
      width={7}
      height={12}
      viewBox='0 0 7 12'
      fill='none'
      xmlns='http://www.w3.org/2000/svg'
    >
      <path
        d='M0.75 1L5.75 6L0.75 11'
        stroke='currentColor'
        strokeWidth={1.2}
        strokeLinecap='round'
        strokeLinejoin='round'
      />
    </svg>
  );
}

export default ChevronLeftIcon;
