function LibIcon() {
  return (
    <svg viewBox="0 0 16 16" fill="none" xmlns="http://www.w3.org/2000/svg">
      <path
        d="M3.688 9.371h2.295c.38 0 .688.308.688.688v2.295c0 .38-.308.689-.688.689H3.688A.69.69 0 0 1 3 12.354V10.06c0-.38.308-.689.688-.689Zm5.829 0h2.295c.38 0 .688.308.688.688v2.295c0 .38-.308.689-.688.689H9.517a.69.69 0 0 1-.689-.689V10.06a.69.69 0 0 1 .689-.689Zm0-5.414h2.295c.38 0 .688.308.688.688V6.94c0 .38-.308.689-.688.689H9.517a.69.69 0 0 1-.689-.689V4.645c0-.38.309-.688.689-.688Zm-5.829 0h2.295c.38 0 .688.308.688.688V6.94c0 .38-.308.689-.688.689H3.688A.69.69 0 0 1 3 6.94V4.645c0-.38.308-.688.688-.688Z"
        stroke="currentColor"
        strokeWidth={1.2}
        strokeLinecap="round"
      />
    </svg>
  );
}

export default LibIcon;
