function MicroOffIcon() {
  return (
    <svg
      width="24"
      height="24"
      viewBox="0 0 24 24"
      fill="none"
      xmlns="http://www.w3.org/2000/svg"
    >
      <g id="Icon/MicroOff">
        <path
          id="Subtract"
          fillRule="evenodd"
          clipRule="evenodd"
          d="M9 11.9387V12.4C9 13.2837 9.71634 14 10.6 14H11.0613L9 11.9387ZM13.0613 16H10C8.34315 16 7 14.6569 7 13V12C7 11.4477 6.55228 11 6 11C5.44772 11 5 11.4477 5 12V13C5 15.7614 7.23858 18 10 18H11V19.9998H9.6C9.04772 19.9998 8.6 20.4475 8.6 20.9998C8.6 21.5521 9.04772 21.9998 9.6 21.9998H14.4C14.9523 21.9998 15.4 21.5521 15.4 20.9998C15.4 20.4475 14.9523 19.9998 14.4 19.9998H13V18H14C14.3311 18 14.6547 17.9678 14.9678 17.9064L13.0613 16ZM18.37 15.4315L16.8568 13.9184C16.9498 13.6289 17 13.3203 17 13V12C17 11.4477 17.4477 11 18 11C18.5523 11 19 11.4477 19 12V13C19 13.8826 18.7713 14.7118 18.37 15.4315ZM15 12.0615L9 6.06152V4.1C9 3.21634 9.71634 2.5 10.6 2.5H13.4C14.2837 2.5 15 3.21634 15 4.1V12.0615Z"
          fill="#F2F2F2"
        />
        <rect
          id="Rectangle 1100"
          x="3.41406"
          y="2"
          width="26.2811"
          height="2"
          rx="1"
          transform="rotate(45 3.41406 2)"
          fill="#E94444"
        />
      </g>
    </svg>
  );
}

export default MicroOffIcon;
